New Balance CK4030 V4 SPIKE SHOE

NEW BALANCE CK403014

No Sew tip for streamlined durability

Moulded heel overlay for reinforced fit

REVlite cushioning with engineered ventilation

Recessed 11 spike configuration

Leather Upper

Revlite Midsole

The post New Balance CK4030 V4 SPIKE SHOE appeared first on Markhor Sports.