GM ORIGINAL ALL ROUNDER

New Insole For Improved Arch Support & Comfort

LIGHTWEIGHT UPPER

Three dimensional comfort lining for superior, long lasting fit and feel

Ergonomic slip lasted construction for consistent sock-like fit time after time

Molded TPR heel cradle locks foot in place maintaining the shoe’s integrity and protecting the delicate heel area

GM loPro SOLE UNIT

GM loPro sole unit for a sleek, athletic, functional shoe minus the bulk

Compression molded, lightweight EVA mid-sole for superior cushioning and comfort

Compression molded rubber out-sole with multi cleat configuration for fantastic grip

Injection molded mid-foot shank provides stability through the arch reducing foot fatigue

TRI-LAYER CUSHIONING

Level 1: Ergonomic cold press molded EVA foot bed with natural latex heel insert

Level 2: Cushioned EVA strobel stitched insole board

Level 3: Compression molded phylon mid sole providing perfect balance between cushioning and weight

The post GM ORIGINAL ALL ROUNDER appeared first on Markhor Sports.