GN PLAYER BATTING SHOE

Gray-Nicolls Players Batting Cricket Shoes has all the same features as the Players Spike.

Fluid-Fit Technology

Engineered breathable upper fusing

Two ultra-thin materials for support

Second-skin-like fit.

Power-band Lite offering incredible support throughout the shoe to improve the speed of turns.

Our Speed-base Batting Out-sole is an ultra-thin stable sole unit with strategic spike configuration.

Introducing Impulse+, a new mid-sole compound with a raised heel, giving batsmen the ultimate lightweight conditioning.

Airflow X Foot-bed, a lightweight matrix design for cushioning and airflow.

The post GN PLAYER BATTING SHOE appeared first on Markhor Sports.