NEW BALANCE CK4020 V5 SHOES

PRODUCT DESCRIPTION

FuelCell foam provides a dynamic sensation that aids in propelling you ahead

Synthetic overlays are strategically positioned at the high-abrasion toe area

The heel incorporates a molded overlay to enhance the fit’s durability

Tailor your fit with an adjustable lace closure

Weighs 499 grams (17.6 oz)

Composition Enhancing breathability and easy cleaning

The upper is crafted from perforated synthetic material

The post NEW BALANCE CK4020 V5 SHOES appeared first on Markhor Sports.